| 1 | | | | | | | | | 10 | | | | | | | | | 100 | | | |

|

0

|

10

|

20

|

30

|

| | | | | | |||| | | | | | |||| | | | |

| | | | |

Frequency, GHz

Gain, dB

300 K

|U|

|h_{21}|^2