Fig. 1

Fig. 2

Fig. 3a

| -10 | 0 | 10 | 20 | 30 | 40 | 50 | 60 | 70

|

-1.0

|

-0.5

|

0.0

|

0.5

|

1.0

| | | | | | | | |

| | | | | τ_e/τ_M=10; Gτ_e/p_0=0.1 τ_e/τ_M=100; Gτ_e/p_0=10

time in units of τ_M photovoltage in units of Gd^2/2μ_hp_0

Fig. 3b

Fig. 4a

Fig. 4b

| 0.0 | 0.2 | 0.4 | 0.6 | 0.8 | 1.0

|

-0.8

|

-0.6

|

-0.4

|

-0.2

|

0.0

|

0.2

|

0.4

| | | | | |

| | | | | | |

Position x/d

Current J/eGd

J_e J_h

Fig. 5

Fig. 6

Fig. 7